<template>
    <div class="n_container">
        <div class="n_header">
            <h1>屏监控</h1>
        </div>
        <div class="n_body_container">
            <div class="n_body_container_wraper">
            </div>
        </div>
    </div>
</template>

<style lang="stylus" scoped>
@import '~@css/mixin'
.n_container
    _wh(100%, 100%)
.n_header
    _wh(100%, 84px)
    _bis('../../../images/top_right.png', auto,,left,,)
    line-height 84px
    h1
        _font(36px, 56px, #fff,,left)
        letter-spacing 6px
        font-family "阿里妈妈数黑体" !important
        padding-left 3px
.n_body_container
    _wh(100%, calc(100% - 84px))
    padding 40px 0 20px 54px
.n_body_container_wraper
    _wh(100%, 100%)
</style>
